vt

vt

1lQ1

0 2lQ2

0

1lQ1

2lQ2 t t t t t t

Plasma at rest

Moving plasma

tD

1

4

1

4 Fe^{55}

double detector

bisectional plane instrumental axis

Quartz crystal

SUN Flare

4 1 Q Q